(cm) xy DCA 2.5 - 2- 1.5

- 1- 0.5

- 0 0.5 1 1.5 2 2.5

Counts

0 2000

4000

6000

8000

10000

12000

14000 d

= 2.76 TeV NNs ALICE, Pb-Pb,

| < 10 cm z |DCA | < 1 cm z |DCA